Title: Build a composite or cavity wall system.
Course: Masonry II (17008-II) > Section: Constructing Commercial Masonry

Building should include laying out and constructing, according to specifications, a 12-foot composite wall, using 8-inch block and a single wythe of brick. Wall must include reinforcements and meet all local building codes.

Process/Skill Questions:

- What scaling system is used for composite wall construction?
- What are the components of a cavity wall?

NCCER Masonry Standards

Level Two, Module Five (28205-14): Advanced Laying Techniques

This module contains detailed information that directs the mason in accomplishing the actual construction of walls, arches, and other useful structures. The text explains construction techniques, safety requirements, and interaction with structure components.