Title: Calculate turbine temperatures.
Course: Aircraft Pilot Training II (20053-II) > Section: Understanding Aircraft Performance

Calculation should include the following:

- Variations of exhaust gas temperature (EGT) systems bear different names based on the location of the temperature sensors.
- Common turbine temperature sensing gauges include the turbine inlet temperature (TIT) gauge, turbine outlet temperature (TOT) gauge, interstage turbine temperature (ITT) gauge, and turbine gas temperature (TGT) gauge.

PLT009