Title: Describe the need for oxygen system inspection.
Course: Aircraft Pilot Training II (20053-II) > Section: Exploring Aeromedical Issues

Description should include the following:

- Oxygen systems, either as part of an aircraft system or supplemental oxygen bottles, have specified inspection and service instructions as part of the aircraft POH.

PLT327