Title: Demonstrate calibration of a color proofer to manufacturer’s specifications.
Course: Graphic Imaging Technology II (11154-II) > Section: Understanding Color Management

Demonstration should include the color calibration of color proofing equipment (e.g., copier, printer) using a software and hardware device.

Process/Skill Questions:

- How long does it typically take to perform a calibration?