Title: Model series, parallel, and series-parallel circuits.
Course: Energy Transmission and Distribution, Advanced (20902-II) > Section: Applying Laws and Theories Related to Energy Transmission and Distribution

Modeling should include

- drawing the circuit
- building the circuit
- answering word problems by measuring the circuit
- troubleshooting the circuit.

Process/Skill Questions:

- What are the advantages of a series circuit?
- What does amperage do in a series-parallel circuit?
- What type of circuit is common in residential wiring, and why?