Title: Perform measurements.
Course: Energy Transmission and Distribution, Advanced (20902-II) > Section: Analyzing Technical and Engineering Drawings

Performance should include

- using measurement tools
- measuring site plans
- laying out circuits or pipeline system segments.

Process/Skill Questions:

- What is the importance of conducting and/or recording measurements?
- What are three primary measurement tools used in the energy industry, and how are they used?