Title: (Optional) Apply the principles of design, layout, and typography.
Course: Computer Information Systems, Advanced (10005-III) > Section: Producing Desktop Published Documents for Print and Electronic Distribution

Application should be made by using appropriate

- font
- font size
- font style and effects
- white space
- column position and spacing
- page margins
- graphic text placements
- image positioning within text wrapping in desktop published documents.