Title: Maintain various cable types.
Course: Television and Media Production I (11103-I) > Section: Production: Managing Equipment

Maintenance should include proper coiling, identification of various cable types and connectors, proper usage, and storage.

Process/Skill Questions:

- What is the proper method of coiling various types of audio and video cable?
- What types of failures can result from improper cable handling?