Title: Prepare electronic titles for shows.
Course: Television and Media Production I (11103-I) > Section: Production: Introducing Control-Room Equipment

Preparation may include lower thirds. It should also include the use of the correct fonts, colors, and sizes.

Process/Skill Questions:

- Why is font selection important?
- Why is color selection important?
- What is the definition of television-safe or title-safe area?