Title: (Optional) Troubleshoot technical problems.
Course: Television and Media Production I (11103-I) > Section: Production: Managing Equipment

Troubleshooting, or tracing issues to the root cause of the problem, may include

- following the signal
- using troubleshooting trees
- using a checklist.

Process/Skill Questions:

- What does following the signal mean?
- What is a troubleshooting tree?
- Why is troubleshooting preferred to swapping the equipment out?