Title: Identify service precautions related to service of the internal combustion engine of a hybrid vehicle.
Course: Automotive Technology I (20104-I) > Section: Engine Repair: General

Identification should be based on service materials and manufacturer guidelines. (Note: Engine may start at any time.)

ASE Education Foundation
2017 Maintenance and Light Repair (MLR) Level
I. Engine Repair
A. General
Task 7

Process/Skill Questions:

- Why is it important to place the key fob at least 20 feet away from the vehicle when servicing?
- How should the high voltage system be disabled in a hybrid?