Title: Demonstrate safety in the agricultural mechanics lab/workshop.
Course: Operating the Farm Business (18301-III) > Section: Practicing Safety in Agricultural Production Enterprises

Demonstration should include

- passing written tests with 100% accuracy on
  - general lab/workshop safety
  - safety and operating procedures for all tools, equipment, and machinery
  - the major parts of all tools, equipment, and machinery
- passing a proficiency/performance test with 100% accuracy for all tools, equipment, and machinery
- following manufacturer instructions and reviewing safety manuals, when applicable
- following all safety guidelines and procedures when using tools, equipment, and machinery
- selecting PPE for the operation
- following the safety standards and regulations of the EPA, Occupational Safety and Health Administration (OSHA), the Equipment and Engine Training Council (EETC) Education Committee, and SDS.

Process/Skill Questions:

- What are the dangers of running an engine in a confined space without proper ventilation?
- Why is it important to achieve 100% accuracy on tests regarding safety and operating procedures before using tools, equipment, and machinery?
- What information should be sent with emergency responders to the hospital with the student if a chemical is splashed in an eye or wound?

Teacher Resource: The Safety Best Practice Guide for CTE, Virginia Department of Education ($WIKI_REFERENCE$/pages/94)