Title: (Optional) Perform safety inspections of all equipment and accessories.
Course: Welding II (13207-II) > Section: Oxyfuel Gas Gutting (OFC Track Burner)

Performance should include a visual inspection of the following OFC Track Burner equipment and accessories on a daily basis, in accordance with the instructor's or employer's policy:

- Hoses
- Cords
- Gauges