Title: Emergency Medical Technician Educational Program Guidelines Update 2022-2023
Course: Emergency Medical Technician III (14055-III) > Section: ADDITIONAL COURSE INFORMATION (for instructors only; do not publish for students)

The Virginia Department of Education (VDOE), in collaboration with the Virginia Department of Health, has updated the Emergency Medical Technician (EMT) Educational Program Guide (https://doe.virginia.gov/administrators/superintendents_memos/2022/223-22a.pdf).

Information and forms (Initial BLS Training Programs First Class and Last Class paperwork) for enrolling students in the EMT programs can be obtained in the Virginia OEMS Training Program Administration Manual (https://www.vdh.virginia.gov/emergency-medical-services/education-certification/documents-forms-downloads/ems-training-program-administration-manual/).

For more information on this update, please refer to the Virginia Department of Education's Superintendent’s Memo #223-22 (https://doe.virginia.gov/administrators/superintendents_memos/2022/223-22.pdf).