Title: Use hand tools.
Course: Electricity III (17102-III) > Section: Using Tools and Materials

Use should include

- various types of hand tools (e.g., hand threader, RG6 compression connectors, coax stripper, punch down tool, RJ45 crimp tool, RJ45 cutting tool)
- steps for correct operation
- maintenance associated with each tool
- compliance with  manufacturer instructions, government regulations, and the instructor's guidelines.

Process/Skill Questions:

- Why is hand tool safety important?
- What is a tool list for an advancing apprentice?
- Why should workers properly care for and maintain hand tools?
- How does the condition and maintenance of hand tools affect safety?