Title: Identify cybersecurity risks in product tracking systems.
Course: Cybersecurity in Food and Agriculture (18204-1) > Section: Investigating Cybersecurity in Agricultural Marketing and Distribution

Identification should include

- improper labeling
- intentional manipulation of labels and codes (e.g., barcodes, radio frequency identification [RFID], quick-response [QR] codes)
- consequences of product recalls.

Process/Skill Questions:

- What are the economic and health consequences of mislabeling of products?
- What are the potential risks of large product recalls?
- What governing body is responsible for product recalls?
- How are consumers contacted regarding product recalls?