Title: Complete the Miss Utility online training (Virginia811).
Course: Utility/Heavy Construction I (20052-I) > Section: Practicing Safety

Completion should include

- excavator computer-based training (website) in English and Spanish
- teacher resources.

Process/Skill Questions:

- What is Virginia 811?
- Why is it important to avoid utilities?