Title: Demonstrate conversion techniques for units of measurement.
Course: Engineering Studies (21002) > Section: Practicing Engineering Fundamentals

Demonstration should include converting U.S. customary units to Systems International (SI) units, and vice versa. Measurements may include

- distances/lengths
- weights
- volumes
- energy (BTUs)
- rates
- power.

Process/Skill Questions:

Case study use is suggested as motivation to why conversions are important (e.g., international engineering collaboration, consequences of misinterpretation in measurement).