Title: List the members of a dental team and the characteristics, educational requirements, and responsibilities of each member.
Course: Dental Careers I (14054-I) > Section: Introducing Dentistry and the Dental Team

List should include the following members of a dental team:

- General dentist
- Dental specialist
- Registered dental hygienist
- Certified dental assistant
- Registered dental assistant II
- Certified laboratory technician
- Anesthesia provider

Process/Skill Questions

- How is the concept of a team applied in dentistry?
- How does the display of professional characteristics influence patient-staff relationships?
- Why is a dental team a good example of a career ladder?