Title: Describe the importance of quality assurance and process planning.
Course: Precision Machining Technology II (13203-II) > Section: Applying the Fundamentals of Machining

Description should include

- quality management systems
- inspection reports
- documentation and traceability
- statistical process control
- standards and specifications (e.g., mean, median, mode).

Process/Skill Questions:

- What is a bell curve?
- What are mean, median, average, and standard deviation?