Title: Use Machinery’s Handbook.
Course: Precision Machining Technology II (13203-II) > Section: Applying the Fundamentals of Machining

Use should include an understanding of the purpose of Machinery’s Handbook as a reference tool.

Process/Skill Questions

- How is Machinery’s Handbook used in the machine shop?
- How is Machinery’s Handbook organized?