Title: Inspect the service brake chambers, diaphragm, clamp, spring, pushrod, clevis, and mounting brackets.
Course: Diesel Equipment Technology II (20107-II) > Section: Brakes: Servicing the Mechanical/Foundation Brakes

Inspection should include the condition of the brake chambers and associated hardware.

Process/Skill Questions:

- What are possible causes if the brake chambers do not operate according to manufacturer guidelines?
- What is the repair procedure for replacing a brake chamber?
- How is the deference between a long stroke and standard brake chamber identified?