Title: Identify pans, covers, gaskets, seals, wear rings, and crankcase ventilation components.
Course: Diesel Equipment Technology II (20107-II) > Section: Diesel Engines: Servicing the Engine Block

Identification should follow industry standards and include

- removing components
- cleaning components
- inspecting components
- installing components
- comparing aerobic and anaerobic sealers.

Process/Skill Questions:

- What are the consequences of using improper cleaning procedures?
- How can excessive use of silicone sealant damage the engine?