Title: Test the starter relays and solenoids/switches.
Course: Diesel Equipment Technology II (20107-II) > Section: Electrical/Electronic Systems: Servicing the Starting System

Testing should include using the voltage drop testing for power source (available voltage) and checking the ground.

Process/Skill Questions:

- What is the function of a relay?
- What is (are) the function(s) of a solenoid?
- How is a relay tested?