Title: Identify engine surging, rough operation, misfiring, low power, slow deceleration, slow acceleration, and shutdown problems.
Course: Diesel Equipment Technology II (20107-II) > Section: Diesel Engines: General

Identification should include

- verifying the problem and condition
- verifying engine diagnostic codes with Electronic Technician (ET) software
- using appropriate electrical and mechanical diagnostic equipment
- determining the needed action.

Process/Skill Questions:

- Where is the diagnostic code interpretation located?
- What is the order in which engine tests are performed?