Title: Inspect the power steering pump drive gear and coupling device.
Course: Diesel Equipment Technology II (20107-II) > Section: Suspension and Steering: Servicing Steering Column

Inspection should include determining whether the steering pump is mounted on the engine.

If it is, it should be inspected for wear while the engine is running. In some instances, the pump may require removal to inspect the coupling device.

Process/Skill Questions:

- What is considered excessive wear?
- What should be done when wear is found?