Title: Inspect the air system pressure controls.
Course: Diesel Equipment Technology II (20107-II) > Section: Brakes: Servicing the Air Brakes

Inspection should include the governor cut-in and cut-out tests, according to manufacturer guidelines, to ensure operation.

Process/Skill Questions:

- When is the governor within specifications?
- How can one tell whether the air system lines are properly routed?