Title: Inspect the stop light circuit switches, wiring, and connectors.
Course: Diesel Equipment Technology II (20107-II) > Section: Brakes: Servicing the Air Brakes

Inspection should include using a DMM or a test light to indicate relevant components that may fail.

Process/Skill Questions:

- What is the purpose of the brake warning light?
- How is a brake warning light tested?
- What will activate the brake warning light?