Title: Identify recommended service and maintenance needs.
Course: Automotive Fixed Operations (20906) > Section: Developing Customer Relations Skills in the Automotive, Diesel, and Collision Industries

Identification should include

- reviewing manufacturer scheduled maintenance, both normal and severe duty
- automated scheduling of service by some manufacturers.

Process/Skill Questions:

- What is the importance of maintaining manufacturer recommended service intervals?
- What are possible results of poor maintenance?