Title: Identify hose and tubing types, fittings, application, and usage.
Course: Automotive Fixed Operations (20906) > Section: Identifying Miscellaneous Materials

Identification should include

- application and usage
- hose and tubing size
- fitting type
- fitting sizes.

Process/Skill Questions:

- Why should air brake hosing be approved by the Department of Transportation?
- What type of fittings are used for plastic tubing?
- What is the purpose of a flare fitting in a hydraulic system?
- How does one choose the type of hose for fuel and coolant applications?