Title: Diagnose and determine needed repair on manual starting system.
Course: Basic Small Engine Repair (20109) > Section: Diagnosing and Servicing Manual Starting System

Determine if starting system engages and recoils properly, according to manufacturer’s specifications and instructor’s guidelines.

Process/Skill Questions:

- How is diagnosis of a manual starting system different from that of an electrical starting system?
- What steps are taken in diagnosis of a manual starter problem?
- Where would you find information on the different types of manual starters?