Title: Diagnose and determine needed repair on air cleaner system.
Course: Basic Small Engine Repair (20109) > Section: Diagnosing and Servicing Fuel System

Diagnosis should be made by visual inspection of filter elements and checking for restrictions, according to instructor’s guidelines.

Process/Skill Questions:

- When should the air cleaner system be cleaned?
- Why should the air cleaner system be cleaned each year?
- What are some types of air cleaners?