Title: Maintain a clean and orderly work area.
Course: Basic Small Engine Repair (20109) > Section: Performing Shop Operations

Maintenance should ensure neat and well-maintained office, storage, customer, shop, and grounds areas; clean and regularly maintained tools and equipment; and precautions for keeping customer’s unit and unit contents clean.

Process/Skill Questions:

- As long as the specific repair technician knows where everything is, does it matter whether a work area is orderly?
- What are the benefits of maintaining a clean and orderly workspace?
- In a typical small engine repair shop with multiple workers, who will do the cleanup?