Title: Read a multimeter.
Course: Basic Small Engine Repair (20109) > Section: Diagnosing and Servicing General Electrical System

Reading should include following manufacturer’s specifications and instructor’s guidelines to

- set meter to proper specifications
- determine desired range
- determine proper lead placement
- adhere to safety guidelines
- determine electrical function.

Process/Skill Questions:

- How can proper use of a multimeter aid in troubleshooting a problem in the electrical system?
- Why is it necessary to obtain correct readings when diagnosing an electrical problem?
- What could result from an incorrect reading of the multimeter?