Title: Identify quality assurance practices in health care.
Course: Medical Assistant I (14151-I) > Section: Maintaining Sterile Equipment

Identification should include performing equipment quality controls as per manufacturer guidelines and procedures, per OSHA requirements.

Process/Skill Questions:

- What procedure would be used to document quality controls for various pieces of equipment?
- Why are quality controls important? What can they indicate?