Title: Peer review all proposals.
Course: Engineering Practicum IV (21047) > Section: Designing a Practicum Project

Peer reviews should include positive and constructive feedback for the presenter on

- verbal and presentation skills
- nonverbal actions
- clarity of the presentation.

Process/Skill Questions:

- Why is peer feedback needed?
- What are benefits of peer feedback vs. teacher (mentor) feedback?
- What defines constructive feedback?