Title: Document a final project report.
Course: Engineering Practicum IV (21047) > Section: Designing a Practicum Project

Documentation should include

- abstract
- introduction
- research questions and/or hypothesis
- methods and materials
- results
- conclusions
- appendices (e.g., raw data, sketches, notes, surveys)
- references and works cited.

Process/Skill Questions:

- What elements belong in a technical report?
- What is the purpose of an abstract?
- Why should you include appendices in the report?
- What were the metrics involved in the design of the solution?