Title: Construct simple electronic circuits from a schematic.
Course: Electronics Systems I (17106-18) > Section: Exploring Circuits as Systems

Construction should include

- placing components on a breadboard
- making connections to build a functioning circuit
- matching a given schematic
- simulating a functioning circuit in computer software.

Process/Skill Questions:

- What are the parts of a circuit?
- How are circuits constructed from schematics using connections?
- How do schematics use computer software simulations? What are the advantages of doing so?
- How are soldering techniques used in the construction of circuits?
- How are circuits manufactured in large quantities?