Title: Perform experiments related to biomaterials and biomechanics.
Course: Biomedical Engineering (21049) > Section: Exploring Biomechanics and Biomaterials

Performance should include collecting and analyzing data for use in designing solutions (e.g., stress, strain, and failure of a biomaterial).

Process/Skill Questions:

- What equipment is typically used for biomechanical testing?
- What alternative biological models can be used in experimentation?
- How does biomaterial failure affect iteration of design?
- What is material variability? How does it affect biomechanical failure?