Title: Explain techniques of cellular and tissue engineering.
Course: Biomedical Engineering (21049) > Section: Exploring Cell and Tissue Engineering and Regenerative Medicine

Explanation should include

- techniques used for collection, storage, multiplication, and transportation of tissue cultures
- the importance of documentation and data tracking to ensure proper identification
- the concept of tissue remodeling.

Process/Skill Questions:

- What procedures are used to track laboratory cultures?
- How are cultures collected and stored?
- How are engineered tissues (e.g., skin, cartilage, organs) created?
- What other biological applications might be studied using these techniques?