Title: Inspect, remove, and/or replace suspension-system coil springs and spring insulators.
Course: Automotive Technology III (20104-III) > Section: SUSPENSION AND STEERING: Suspension System

Procedures should include

- conducting a visual inspection, according to state inspection procedures
- using specialized tools, according to manufacturer guidelines.

Process/Skill Questions:

- What precautions should be taken when working with coil springs?
- What can happen if the spring is not removed according to established safety procedures?