Title: Perform calibration/recalibration, initialization, or relearn procedures as required.
Course: Automotive Technology III (20104-III) > Section: BRAKES: General

Performance should include consulting OEM service information.

Process/Skill Question:

- What are the consequences of not following OEM service procedures?