Title: Perform calibration /recalibration, initialization, or relearn procedures as required.
Course: Automotive Technology III (20104-III) > Section: ELECTRICAL/ELECTRONIC SYSTEMS: General

Performance should include

- confirming current calibration
- ensuring battery is fully charged
- following manufacturer procedures.

Process/Skill Questions:

- What is the importance of maintaining proper system voltage during recalibrating or reprogramming?
- What equipment is necessary to perform recalibrating and reprogramming?