Title: Diagnose pressure concerns in a transmission, using hydraulic principles (i.e., Pascal’s law).
Course: Automotive Technology III (20104-III) > Section: AUTOMATIC TRANSMISSION AND TRANSAXLE: General

Diagnosis should include using Pascal's law to analyze transmission hydraulic circuit operation.

Process/Skill Questions:

- How can Pascal's law explain the operation of valve bodies?
- What electronic components are used to control hydraulic circuits?
- What applies pressure to hydraulic circuits?