Title: Perform pressure tests on transmissions/transaxles equipped with electronic pressure control; determine needed action.
Course: Automotive Technology III (20104-III) > Section: AUTOMATIC TRANSMISSION AND TRANSAXLE: General

Procedures should include

- identifying the correct test ports for specific tests
- following manufacturer instructions.

Process/Skill Questions:

- What conditions cause pressures to vary from manufacturer specifications?
- How does fluid level and condition affect the pressure reading?