Title: Inspect, test, and/or service A/C compressor clutch components and/or assembly; determine needed action.
Course: Automotive Technology III (20104-III) > Section: HEATING, VENTILATION, AND AIR CONDITIONING (HVAC): Refrigeration System Components

Procedures should include using specialized tools and referring to service materials and manufacturer guidelines.

Note: EPA Clean Air Act Section 609 required

Process/Skill Questions:

- What tools are needed to adjust or replace the A/C clutch components?
- What procedures are used to adjust or replace the A/C clutch components?
- What is likely to occur if an A/C clutch is misadjusted?