Title: Inspect, test, adjust, repair, and/or replace electrical/electronic components and circuits.
Course: Automotive Technology III (20104-III) > Section: AUTOMATIC TRANSMISSION AND TRANSAXLE: In-Vehicle Transmission/Transaxle

Procedures should include

- testing, replacing, or adjusting powertrain mounts and subframes
- checking for proper wheel alignment.

Process/Skill Questions:

- What are the procedures to inspect powertrain mounts?
- What are the procedures for proper cradle alignment?
- What are the causes of broken or worn powertrain mounts?