Title: Remove and reinstall transmission/transaxle and torque converter; inspect engine core plugs, rear crankshaft seal, dowel pins, dowel pin holes, and mating surfaces.
Course: Automotive Technology III (20104-III) > Section: AUTOMATIC TRANSMISSION AND TRANSAXLE: Off-Vehicle Transmission and Transaxle

Procedures should include

- removing the transmission
- flushing and checking the cooler
- aligning the transmission to the engine
- replacing the transmission.

Process/Skill Questions:

- What tools are used to remove and reinstall the transmission/transaxle?
- Why is the transmission-to-engine alignment critical?
- Why do engine core plugs need to be inspected?