Title: Diagnose vehicle comfort, convenience, access, safety, and related systems operation; determine needed action.
Course: Automotive Technology III (20104-III) > Section: ELECTRICAL/ELECTRONIC SYSTEMS: Body Electric Systems

Diagnosis should include

- verifying customer concerns
- identifying related system
- inspecting for preexisting damage (e.g., cracks, stains, missing fasteners)
- scanning for DTCs.

Process/Skill Questions:

- Why is it important to check every component installed in the door panel before disassembly?
- Why is it important to verify all components function after repair?