Title: Inspect, remove, and replace water/coolant pumps.
Course: Automotive Technology III (20104-III) > Section: ENGINE REPAIR: Lubrication and Cooling Systems

Procedures should include following manufacturer guidelines.

Process/Skill Questions:

- How should a technician inspect a water pump? How often should it be inspected?
- What are the procedures to replace a water pump?
- What precautions should be taken when replacing a water pump?