Title: Diagnose charging system for causes of undercharge, no-charge, or overcharge conditions; determine needed action.
Course: Automotive Technology III (20104-III) > Section: ELECTRICAL/ELECTRONIC SYSTEMS: Charging System (Low Voltage)

Procedures should include

- identification of components
- visual inspection, including aftermarket modifications
- consulting manufacturer specifications
- choosing correct testing equipment.

Process/Skill Questions:

- What is the effect of aftermarket equipment on the charging system?
- Why is battery registration important?