Title: Leak test A/C system; determine needed action.
Course: Automotive Technology III (20104-III) > Section: HEATING, VENTILATION, AND AIR CONDITIONING (HVAC): General

Leak test should include using dyes or a refrigerant leak detector and following service materials as well as federal and manufacturer guidelines.

Note: Environmental Protection Agency (EPA) Clean Air Act Section 609 required

Process/Skill Questions:

- What specialized tools are needed to perform a leak test on an A/C system?
- What are the procedures to perform a leak test on an A/C system?
- What are the safety and environmental concerns when performing a leak test on an A/C system?