Title: Inspect converter flex (drive) plate, converter attaching bolts, converter pilot, converter pump-drive surfaces, converter end play, and crankshaft pilot bore.
Course: Automotive Technology III (20104-III) > Section: AUTOMATIC TRANSMISSION AND TRANSAXLE: Off-Vehicle Transmission and Transaxle

Inspection should include checking the

- plate (for cracks)
- converter ring gear teeth
- crankshaft bore
- front pump bushing.

Process/Skill Questions:

- What should the technician look for when inspecting a converter flex (drive) plate?
- How is the converter input checked?
- What should the crankshaft pilot bore look like?