Title: Test the A/C-related electronic engine control systems.
Course: Diesel Equipment Technology III (20107-III) > Section: Heating, Ventilation, and Air Conditioning: Servicing the Electrical Operating Systems and Related Controls

Testing should include a manufacturer performance A/C test to ensure the system is working as designed.

Process/Skill Questions:

- What effect would using the wrong test tool have on electronic components?