Title: Inspect the flywheel housing(s) to transmission housing/engine mating surface(s).
Course: Diesel Equipment Technology III (20107-III) > Section: Drive Train: Servicing the Clutch

Inspection should include

- checking for cracks, oblong bolt holes, and the overall condition
- checking for oil leaks within the housing
- measuring the flywheel housing face and bore runout
- determining any needed action.

Process/Skill Questions:

- What might be the cause of oil leaks within the bell housing?
- What effect would an improperly aligned bell housing have on the drive shaft alignment?