Title: Inspect the hydraulic clutch slave and master cylinders, lines, and hoses.
Course: Diesel Equipment Technology III (20107-III) > Section: Drive Train: Servicing the Clutch

Inspection should include

- checking for fluid leaks
- confirming proper fluid levels
- checking the condition of lines and hoses
- determining any needed action.

Process/Skill Questions:

- What would occur if the system were low on hydraulic fluid?
- How does one know when the hydraulic fluid is contaminated?
- What results can be expected when air is allowed into any hydraulic system?