Title: Inspect the input shaft, gear, spacers, bearings, retainers, and slingers.
Course: Diesel Equipment Technology III (20107-III) > Section: Drive Train: Servicing the Transmission

Inspection should include

- checking the input shaft for end play and wear
- visually verifying all gears are intact and not discolored
- determining any needed action.

Process/Skill Questions:

- What are oil slingers, and what is their purpose?
- When a transmission is removed and installed, should a new crankshaft bearing and throw-out bearing be installed?