Title: Correct the A/C compressor lubricant level (if applicable).
Course: Diesel Equipment Technology III (20107-III) > Section: Heating, Ventilation, and Air Conditioning: Servicing the Compressor and Clutch

Correction should include

- inspecting the lubricant level
- determining the amount of oil to be removed during the recovery process.

Process/Skill Questions:

- How is oil added into the system before it is closed?
- How is oil added into a closed system?