Title: Inspect the power divider (inter-axle differential) assembly.
Course: Diesel Equipment Technology III (20107-III) > Section: Drive Train: Drive Axle

Inspections should include the following:

- Oil leaks
- Air leaks
- Cracks
- Plugged breathers
- Attached components movement

Process/Skill Questions:

- What issue could a plugged breather cause?
- What movement in the spring saddles can break part of the axle housing? What part does it break? What issue does this cause?