Title: Store the refrigerant.
Course: Diesel Equipment Technology III (20107-III) > Section: Heating, Ventilation, and Air Conditioning: Handling the Refrigerant

Storage should include

- following Environmental Protection Agency (EPA) guidelines to ensure the refrigerant container is inspected and approved before use
- identifying a location where cylinders can be stored upright and in an area without combustible materials.

Process/Skill Questions:

- What is the maximum temperature the refrigerant should be stored?
- Which recovery process is slower: vapor or liquid recovery?