Title: Replace the A/C system pressure, thermal, and electronic devices.
Course: Diesel Equipment Technology III (20107-III) > Section: Heating, Ventilation, and Air Conditioning: Servicing the Compressor and Clutch

Replacement should include

- inspecting the system and devices
- testing the system and devices
- using the proper tools.

Process/Skill Questions:

- What tool is used to remove refrigerant from the HVAC system?
- Where should refrigerant be stored while being vacuumed from a system?