Title: Inspect the water pump.
Course: Diesel Equipment Technology III (20107-III) > Section: Heating, Ventilation, and Air Conditioning: Servicing the Heating and Engine Cooling Systems

Inspection should include

- pressure testing the coolant system
- confirming conditioning protection levels
- visual examination of the water pump.

Process/Skill Questions:

- What is the difference between a weep and a leak on a water pump?
- What will occur if the water pump fails to move water through the system?