Title: Check the transmission fluid level and condition.
Course: Diesel Equipment Technology III (20107-III) > Section: Drive Train: Servicing the Transmission

Checking should include

- visually inspecting the oil level and condition, according to manufacturer’s guidelines
- adding lubricant, if needed
- determining any additional service, as needed.

Process/Skill Questions:

- What does metal in the fluid indicate?
- What does milky fluid indicate?
- What does gritty-feeling fluid indicate?