Title: Use ventilation procedures for working within the lab area.
Course: Diesel Equipment Technology III (20107-III) > Section: Required Supplemental Tasks: Practicing Lab and Personal Safety

Use should include

- keeping bay doors open when possible
- operating the lab exhaust fans
- using an exhaust ventilation hose on running vehicles.

Process/Skill Questions:

- What are the gases emitted by a running vehicle?
- Why is proper ventilation so important?
- What are the dangers of a running vehicle in a confined space?