Title: Reinstall the flywheel.
Course: Diesel Equipment Technology III (20107-III) > Section: Drive Train: Servicing the Clutch

Reinstallation should include

- removing the flywheel
- inspecting the mounting area on the crankshaft and rear main oil seal
- measuring the crankshaft end play
- installing the flywheel according to manufacturer guidelines.

Process/Skill Questions:

- What might occur if the flywheel is installed reversed?
- What might be caused by an improperly torqued flywheel?