Title: Inspect the transmission mounts, insulators, and mounting bolts.
Course: Diesel Equipment Technology III (20107-III) > Section: Drive Train: Servicing the Transmission

Inspection should include

- visually checking all mountings for missing or worn bushings
- visually checking the bell housing for missing bolts and worn bolt holes
- making replacements as needed.

Process/Skill Questions:

- What is the function of the transmission mounts?
- What determines that a transmission mount is bad?
- How could a broken mount cause the engine to have excessive vibration?