Title: Reinstall the transmission.
Course: Diesel Equipment Technology III (20107-III) > Section: Drive Train: Servicing the Transmission

Reinstallation should include

- removing the transmission
- installing the transmission, according to manufacturer guidelines.

Process/Skill Questions:

- What would be the consequences of installing a transmission with a cracked bell housing?
- Why will the use of a pilot/alignment shaft be helpful?
- What damage could occur if the transmission does not side in smoothly but is forcibility installed by torquing the bolts?