Title: Inspect the pump inlet for restrictions and leaks.
Course: Diesel Equipment Technology III (20107-III) > Section: Hydraulics: Servicing Pumps

Inspection should include

- performing a visual inspection of the pump’s suction side
- searching the suction line and rubber sleeve for debris, damage, or deterioration
- double-clamping the rubber sleeve on the suction line
- determining any needed action.

Process/Skill Questions:

- Why is the suction line usually made in two pieces connected with a rubber sleeve?
- What is the term used when a pump is starving for oil?