Title: Perform diagnostic procedures using the recommended electronic service tool(s). -3
Course: Diesel Equipment Technology III (20107-III) > Section: Heating, Ventilation, and Air Conditioning: Servicing the Electrical Operating Systems and Related Controls

Performance should include using electronic service tool retrieve codes.

Process/Skill Questions:

Where are the troubleshooting steps found for retrieved codes?