Title: Correct the system lubricant level when replacing the evaporator, condenser, receiver/drier or accumulator/drier, and hoses.
Course: Diesel Equipment Technology III (20107-III) > Section: Heating, Ventilation, and Air Conditioning: Servicing the Evaporator, Condenser, and Related Components

Correction should include determining the amount of oil removed during the recovery process.

Process/Skill Questions:

- How is oil added into the system before it is closed?
- How is oil added into a closed system?