Title: Inspect the single-disc clutch pressure plate and clutch disc.
Course: Diesel Equipment Technology III (20107-III) > Section: Drive Train: Servicing the Clutch

Inspection should include

- checking the pressure plate and clutch disk for wear, according to manufacturer guidelines
- determining any needed action.

Process/Skill Questions:

- How does the pressure plate and clutch disk operate?
- What are the first signs of a clutch assembly failure?