Title: Inspect the actuators for dents, cracks, damage, and leakage.
Course: Diesel Equipment Technology III (20107-III) > Section: Hydraulics: Servicing Actuators

Inspection should include

- disassembling the actuator
- performing a visual inspection
- determining the cause of failure
- determining which parts can be reused
- determining any needed action.

Process/Skill Questions:

- What problems can a dent in the barrel of the actuator cause?
- What affects can high pressure oil have on a human’s skin?