Title: Inspect the two-plate clutch pressure plate, clutch discs, intermediate plate, and drive pins/lugs.
Course: Diesel Equipment Technology III (20107-III) > Section: Drive Train: Servicing the Clutch

Inspection should include

- checking the pads for wear and discoloration
- checking for missing and worn springs
- checking the condition of drive pins and lugs
- determining any needed action.

Process/Skill Questions:

- How will worn clutch pads affect operation?
- What problem might a missing or broken spring cause during operation?