Title: Summarize safety practices.
Course: Cybersecurity Systems Technology, Advanced (10109-IV) > Section: Applying Industry Standards, Practices, and Network Theory

Summary should include the following:

- Electrical safety
  - Grounding

- ESD
  - Static

- Installation safety
  - Lifting equipment
  - Rack installation
  - Placement
  - Tool safety

- Safety data sheets (SDS)
- Emergency procedures
  - Building layout
  - Fire escape plan
  - Safety/emergency exits
  - Fail open/fail close
  - Emergency alert system

- Fire suppression systems
- HVAC

Process/Skill Questions:

- What type of fire suppression is appropriate for a computer room?
- What are the emergency procedures for your building?
- What materials must be accounted for in a company’s SDS documentation?