Title: Collect basic specimens for analysis in a clinical setting.
Course: Medical Assistant II (14151-II) > Section: Assisting Physician with Examination

Collection should include

- urine
- stool
- sputum
- blood specimens.

Collection and analysis must be performed under the supervision of a clinical supervisor and/or an instructor.

Process/Skill Questions:

- How does the collected data aid in diagnosing a patient's illness?
- How does the collected data affect a patient's care?
- What are the legal implications when collecting specimens?