Title: Demonstrate various methods of processing radiographs.
Course: Dental Careers II (14054-II) > Section: Performing Radiographic Procedures

Demonstration should include periapical, bitewing (BW), and extraoral X-rays, with film processed successfully, either automatically or manually, and mounted and labeled according to guidelines.

Process/Skill Questions:

- What are the five steps in manually processing dental radiographs?
- What is the order of solutions in an automatic processor?
- What should be labeled on film mounts?
- What is the optimum temperature of the water in automatic processing tanks?