Title: Explain the effect of pathophysiology on perfusion.
Course: Emergency Medical Technician I (14055-I) > Section: Exploring the Human Body

Explanation should include the interrelationship of body systems as part of the life-support chain.

Process/Skill Questions:

- What body systems are affected during cardiac arrest?
- How does perfusion affect the circulatory and respiratory systems?
- How does CPR, when performed correctly, affect the life-support chain?