Title: Complete clinical requirements for work-based learning.
Course: Emergency Medical Technician I (14055-I) > Section: Participating in Work-Based Learning

Completion adheres to requirements set by the

- state
- region
- locality.

Process/Skill Questions:

- What are the requirements before participating in a supervised EMT clinical rotation?
- Why is it important to be up-to-date on immunizations before working in a clinical setting?
- Why is it necessary to have a criminal background check completed before beginning clinical rotations?