Title: Straighten and align quarter panels, wheelhouse assemblies, and rear body sections (including rails, suspension, or powertrain mounting points).
Course: Auto Body Technology III (20117-III) > Section: Analyzing Unibody and Unitized Structure Inspection, Measurement, and Repair

Procedures should include

- determining the extent of damage
- attaching a pulling or straightening device
- measuring to ensure alignment
- locating quarter panels, wheelhouse assemblies, and rear body sections (including rails, suspension, or powertrain mounting points)

following manufacturer guidelines and recommendations.

Process/Skill Questions:

- Where are quarter panels, wheelhouse assemblies, and rear body sections located?
- What techniques can be used for straightening quarter panels, wheelhouse assemblies, and rear body sections?