Title: Analyze, straighten, and align mash (i.e., collapse) damage.
Course: Auto Body Technology III (20117-III) > Section: Analyzing Frame Damage and Repair

Analysis should include the

- type of damage, as determined by measuring the damaged area
- attachment site and the direction of pull for proper alignment of the damaged area
- inspection of sheet metal alignment following manufacturer guidelines and recommendations.

Process/Skill Questions:

- What method should be used for measuring?
- Where is the attachment site to straighten damage?