Title: Repair signs of corrosion or damage in an electrical system.
Course: Small Engine Technology II (20110-II) > Section: Diagnosing and Troubleshooting the General Electrical System

Repair should include cleaning corrosion from connectors, terminals, and wire ends and replacing a terminal or connector on a wiring harness.

Process/Skill Questions:

- How does one remove corrosion from a terminal/connector?
- What is the purpose of heat shrink?
- What is dielectric grease?
- What type of tape is used for electrical connections or repairs?
- What is soldering?