Title: Troubleshoot the charging circuit, using a manufacturer's guide.
Course: Small Engine Technology II (20110-II) > Section: Diagnosing and Troubleshooting the General Electrical System

Troubleshooting should include using a manufacturer's guide to check for open- and short-circuits and malfunction of electrical components and should be done according to manufacturer's specifications and instructor's guidelines.

Process/Skill Questions:

- What process is used in troubleshooting?
- When would troubleshooting be necessary?
- Where would one find the starting point for determining the problem?