Title: Service a direct current (DC) electric starter/generator.
Course: Small Engine Technology II (20110-II) > Section: Diagnosing and Troubleshooting the General Electrical System

Service should include following manufacturer’s specifications and instructor’s guidelines, cleaning starter/generator, and checking for

- open- or short-circuits
- commentator with growler
- condition of brushes
- condition of bearings.

Process/Skill Questions:

- What conditions would lead to service or repair of a DC starter/generator?
- How would the repair procedure be determined?
- What is the difference in servicing and repairing a DC starter/generator?