Title: Interpret manufacturer’s illustrated parts lists (IPL) and schematics.
Course: Small Engine Technology II (20110-II) > Section: Performing Lab Operations

Interpretation should include

- identification of the types of lab manuals (e.g., manufacturer, professional general, after-market specialty)
- the formats of manuals (e.g., printed and electronic)
- the methods of locating information in them (e.g., table of contents, index, special numbering systems)
- identification of superseded and no longer available replacement parts.

Process/Skill Questions:

- What is the purpose of schematics?
- What happens when schematics in the manual are unclear or confusing?
- What should a repair technician do if superseded or replacement parts are not the same size?
- What is needed to replace parts?