Title: Identify types of motors and/or actuators.
Course: Mechatronics I (13901-I) > Section: Introducing Electrical Systems

Identification should include

- electrical (AC/DC)
- pneumatic
- hydraulic.

Process/Skill Questions:

- What is the difference between AC and DC motors?
- What is the difference between pneumatic and hydraulic motors?