Title: Inspect hand and power tools to ensure safety and usability.
Course: Mechatronics I (13901-I) > Section: Applying Basic Safety Standards for Mechanics

Inspection could include procedures for inspecting, wearing, and removing

- eye protection
- respirator
- hard hat
- gloves
- safety harness
- hearing protection
- safety shoes.

Process/Skill Questions:

- What are some of the basic power tools?
- What are the proper actions to take before using a band saw?
- Why must a power tool with a three-prong plug be grounded?