Title: Discuss the importance of laboratory records and documentation.
Course: Medical Laboratory Technology I (14102-I) > Section: Exploring Foundations in Medical Laboratory Technology

Discussion should include records and documentation associated with blood-banking, microbiology, clinical chemistry, hematology, urinalysis, molecular diagnostics, research, patient laboratory results, and other laboratory-related responsibilities.

Process/Skill Questions:

- Why must medical records be organized? Why must they be kept current?
- Why is a medical record considered a legal document? Why is it important for medical laboratory professionals to understand the legal nature of medical records?
- If medical records are inaccurate, what are the potential ramifications for the patient? The employee? The employer?
- How does a laboratory information system (LIS) interface with patient records?