Title: Compare various forms and grades of water used in the laboratory.
Course: Medical Laboratory Technology I (14102-I) > Section: Performing Basic Laboratory Skills

Comparison should include the following types or grades of water:

- Deionized
- Distilled
- Sterile
- Type I
- Type II
- Type III

Process/Skill Questions:

- What is the process used to prepare deionized water?
- What tests use distilled water? Deionized water?