Title: Maintain safe working practices around production equipment.
Course: Cybersecurity in Manufacturing (13002-III) > Section: Practicing Safety in Manufacturing

Maintenance should include

- identifying potential hazards of each piece of equipment
- demonstrating safe work habits with each type of equipment
- adhering to OSHA standards.

Process/Skill Questions:

- What are the risks of unsafe behavior around production equipment?
- How would safety rules help prevent these risks?