Title: Install a door lock set.
Course: Building Management I (16103-I) > Section: Performing General Building Maintenance

Installation should include

- selecting PPE, materials, and tools
- removing the inside door knob rosette and strike plate
- removing the cylinder and outside knob
- replacing each.

Process/Skill Questions:

- What PPE, tools, and materials are required for replacing a door lock set?
- What are the parts of a lock set? What is the purpose of each part?
- Why might a door lock set need to be replaced?