Title: Repair compression faucet.
Course: Building Management I (16103-I) > Section: Performing Plumbing Maintenance

Repair should include the following steps:

- Assemble tools and equipment.
- Disassemble faucet.
- Remove and replace worn parts.
- Reassemble faucet.

Process/Skill Questions:

- What are some factors that may account for a faucet not working properly?
- What parts of a faucet typically wear out?
- Can all faucets be repaired? Why, or why not?
- What tools are required for repairing a faucet?