Title: Disinfect electrical equipment.
Course: Cosmetology III (19101-III) > Section: Maintaining, Sanitizing, and Disinfecting Implements, Equipment, and Facilities

Disinfecting should include

- removing hair and product from electrical equipment
- using appropriate disinfectant.

Process/Skill Questions:

- Who is responsible for maintaining electrical equipment in a cleaned state?
- What consequences may arise from the use of improperly clean equipment?
- What safety issues should be considered when disinfecting electrical equipment?