Title: Identify testing skills/strategies for certification examination.
Course: Medical Administration (14153-18) > Section: Preparing for Industry Certification

The identification of testing skills and strategies should be undertaken by

- conducting an Internet research project
- reviewing materials from exam and practice-exam providers
- interviewing certified instructors and/or industry-certified professionals.