Title: Maintain patient database.
Course: Medical Administration (14153-18) > Section: Managing Office Activities

Maintenance should include entering and updating information, such as

- patient addresses, email addresses, and telephone numbers
- real-time eligibility (RTE)
- insurance information
- demographic information
- patient condition and medication(s).