Title: Identify water flow and pressure terminology.
Course: Firefighting II (15152-II) > Section: Managing Hydrant Flow and Operability

Identification should include the following pressure types:

- Static
- Normal operating
- Residual
- Flow

Process/Skill Questions:

- How is normal water consumption demand defined?
- What should be the maximum distance between fire hydrants when they are installed in high-value locations?
- What can corrosion do to a fire hydrant? How can it be prevented?