Title: Explain how certification can be revoked or suspended.
Course: Emergency Medical Telecommunications (14055-V) > Section: Exploring Requirements of Quality Assurance, Certification, and Recertification

Explanation should include reasons for suspension or revocation of certification, to include

- involvement in unprofessional activities
- failure to adhere to minimum standards
- inability to perform adequate patient care.

Process/Skill Questions:

- What violations of the code of ethics can lead to revocation or suspension of certification?
- What types of criminal torts can an EMD face for violations?