Title: Explain recertification requirements.
Course: Emergency Medical Telecommunications (14055-V) > Section: Exploring Requirements of Quality Assurance, Certification, and Recertification

Explanation should include that EMDs must accumulate a minimum of 12 CDE hours per certification year through medical/communications training, for a total of 24 hours over the two-year recertification period.

Process/Skill Questions:

- What are the specific continuing education requirements for EMDs in Virginia? Nationally?
- Where are continuing education units reported for documentation?