Title: (Optional) Evaluate electrical problems.
Course: Applied Agricultural Concepts (18002-I-18) > Section: Performing Electrical Operations

Evaluation should include

- determining the cause of the problem using diagnostic tools and/or equipment
- isolating the cause
- taking necessary steps to ensure reduction or elimination of the chance of an electrical fire or other danger.

Process/Skill Questions:

- What precautions should one take before beginning the troubleshooting process?
- How do we determine what diagnostic tool or equipment item to use for troubleshooting?