Title: (Optional) Perform screening functions for drug administration under appropriate supervision, as permitted by state law and regulations.
Course: Pharmacy Technician II (14152-II) > Section: Assisting the Pharmacist in Serving Patients

Performance should include functions such as those listed below, performed under the supervision of a pharmacist or other qualified professional:

- Performing drug/IV rounds
- Anticipating refills of drugs/IVs
- Maintaining a log or electronic chart to identify patient’s IVs checked during rounds and making any accompanying notes
- Screening for immunizations:
  - Review patient's prescription, as needed
  - Review patient's electronic file
  - Obtain information and signatures
  - Inform pharmacist of patient needs
  - Bill insurance companies, if appropriate
- Assist pharmacist in medication reconciliation functions for an institutional patient

See PTCB 2.5, 2.14 (https://www.ptcb.org/lib24watch/files/pdf/169).

See ASHP 5.1 (https://www.ashp.org/-/media/assets/professional-development/technician-program-accreditation/docs/ashp-acpe-pharmacy-technician-accreditation-standard-2018.ashx?la=en&hash=36EAA6511105A6C6BFEA4F30E193892F19E2C385).

Process/Skill Questions:

- What are the proper techniques for a pharmacy technician to use when administering sterile medications?
- What are the basic features of the systems commonly used to anticipate refills of drugs/IVs to ensure appropriate administration?
- What activities can a pharmacy technician perform to support immunization administration in the pharmacy?

Code of Virginia Statutes Related to Pharmacy Technicians

Va. Code §54.1-3320 — Acts restricted to pharmacists

Va. Code §54.1-3321 — Registration of pharmacy technicians