Title: Interpret basic medical laboratory terminology related to immunohematology/transfusion services.
Course: Medical Laboratory Technology II (14102-II) > Section: Understanding the Basics of Immunohematology/Transfusion Services

Interpretation should include terminology such as

- apheresis
- allele
- histocompatibility testing
- human leukocyte antigen
- antibody screen
- antibody panel.

Process/Skill Questions:

- What is the role of complement?
- What is a heterozygous genotype?
- What is a heterozygous phenotype?