Title: Demonstrate safe handling and use of appropriate tools.
Course: Automotive Technology I (20104-I) > Section: Required Supplemental Tasks: Tools and Equipment

Demonstration should include

- wearing associated protective gear and adhering to clothing guidelines and lab/shop policies
- identifying the associated government policies
- describing manufacturer, shop, and government guidelines and policies
- selecting the right tool for the job
- describing each tool’s intended application.

Process/Skill Questions:

- Why is maintenance of tools important?
- Why is it important to use the right tool for the job?
- What are some habits of good tool use?