Title: Perform cooling system pressure and dye tests to identify leaks; check coolant condition and level; inspect and test radiator, pressure cap, coolant recovery tank, heater core, and galley plugs; determine needed action.
Course: Automotive Technology I (20104-I) > Section: Engine Repair: Lubrication and Cooling Systems

Procedures should include

- using a pressure tester
- using a refractometer or test strips
- conducting a visual inspection.

ASE Education Foundation
2017 Maintenance and Light Repair (MLR) Level
I. Engine Repair
C. Lubrication and Cooling Systems
Task 1

Process/Skill Questions:

- What are the procedures for conducting a cooling system pressure test?
- What tools are needed to perform a cooling system pressure test?
- What is the function of a coolant recovery tank?