Title: Describe oxygen systems.
Course: Aircraft Pilot Training II (20053-II) > Section: Exploring Aeromedical Issues

Description should include the following:

- Oxygen system components consist of either pressurized or unpressurized systems.
- Unpressurized systems require the use of supplemental oxygen at specified FAA altitudes.
- Pressurized systems incorporate oxygen systems to maintain a pressurized compartment that does not require supplemental oxygen at or above specified altitudes.

PLT326