Title: Describe environmental control systems as related to humidity and illumination control.
Course: Aircraft Pilot Training II (20053-II) > Section: Operating the Aircraft

Description should include the following:

- Humidity and illumination can affect pilot comfort.
- Most large aircraft cockpits have a separate environmental control panel for pilots to regulate the ambient temperature.
- The illumination on the left and right side of the instrument panel should have the ability to be adjusted independently to suit the individual pilot.

PLT137