Title: Describe aeromedical factors related to fitness for flight.
Course: Aircraft Pilot Training II (20053-II) > Section: Exploring Aeromedical Issues

Description should include the following:

- It is important for a pilot to be aware of the mental and physical standards required for the type of flying performed.

PLT098