Title: Syllabus
Course: Building Management I (16103-I)

Copyright 2016

Virginia Assignment Code: 8590

Suggested Grade Level: 10, 11

Duration: 36 weeks

Prerequisites: None

CTSO: SkillsUSA

Course Description:

Students obtain the knowledge and skills to perform the upkeep of commercial and public buildings and grounds through hands-on training in cleaning operations, building repairs, electrical, plumbing, and grounds maintenance. Contextual instruction and student participation in co-curricular career and technical student organization (CTSO) activities will develop leadership, interpersonal, and career skills. High-quality work-based learning (HQWBL) will provide experiential learning opportunities related to students' career goals and/or interests, integrated with instruction, and performed in partnership with local businesses and organizations.

Note: The Virginia Administrative Code regulates the class size for this course. For additional information, see 8VAC20-120-150, "Maximum class size," or contact the Virginia Department of Education Office of Career, Technical and Adult Education at cte@doe.virginia.gov.

Credentials, Course Sequences, and Career Clusters/Pathways can be found here:

https://www.cteresource.org/career-clusters/architecture-and-construction/building-management-i/