Title: Set up for manual OFC operations and base metal preparation on carbon steel.
Course: Welding I (13207-I) > Section: Demonstrating Thermal Cutting: Oxyfuel Cutting (OFC)

Setup should include

- adhering to written or verbal instructions
- wearing PPE
- identifying types of gases
- assembling components (e.g., gauges, hoses, torch, cutting tip)
- completing a leak test.

Process/Skill Questions:

- What is the safe distance of the tanks from the cutting area?
- When is a hot-work permit required?