Title: Perform safety inspections of all GMAW and GMAW-S equipment and accessories.
Course: Welding I (13207-I) > Section: Demonstrating Gas Metal Arc Welding (GMAW)

Performance should include a visual inspection of the following GMAW and GMAW-S equipment and accessories daily, in accordance with instructor or employer policy:

- Regulator
- Hoses
- Welding leads (e.g., gun, torch, ground cable)

Process/Skill Questions:

- What happens when a gas hose has a hole in it?
- What happens when a contact tip is worn out?
- What happens when a MIG lead is not properly installed?