Title: Perform safety inspections of all equipment and accessories.
Course: Welding I (13207-I) > Section: Demonstrating Shielded Metal Arc Welding (SMAW)

Performance should include a visual inspection of the following SMAW equipment and accessories daily, in accordance with instructor or employer policy:

- Work lead
- Electrode lead

Process/Skill Questions:

- Why is it important to check for exposed wires or damaged leads?
- Why is it important to check insulators on an electrode holder?
- What can happen if a connection is loose on the electrode or ground lead?
- Why is it important for the equipment and workspace, including the floor, to be dry?
- What can happen if combustible material is in or near the workspace?