Title: (Optional) Demonstrate electrical operations as they relate to natural resources and ecology systems.
Course: Introduction to Natural Resources and Ecology Systems (18504) > Section: Developing Mechanical Skills Related to Natural Resources and Ecology Systems

Demonstration should include

- following all safety procedures and protocols
- explaining the principles, language, and symbols of electricity
- using tools and equipment related to electricity
- using calculations related to electricity
- constructing an approved electrical project.

Process/Skill Questions:

- What are the tools used in electrical work?
- What electricity projects would relate to the natural resources industry?
- How are watts, volts, and amperes calculated?
- What is Ohm’s law?
- How does Ohm’s law apply to electricity?
- What is the proper depth to bury underground wiring?
- What class of wire or cable should be used for underground use?
- Why is contacting Miss Utility Virginia essential before excavating?