Title: (Optional) Demonstrate plumbing operations as they relate to natural resources and ecology systems.
Course: Introduction to Natural Resources and Ecology Systems (18504) > Section: Developing Mechanical Skills Related to Natural Resources and Ecology Systems

Demonstration should include

- following all safety procedures and protocols
- explaining the principles, language, and symbols of plumbing
- explaining the safety measures that should be followed when conducting plumbing operations
- using tools and equipment related to plumbing
- using calculations related to plumbing
- completing an approved plumbing project.

Process/Skill Questions:

- What are the tools used in plumbing work?
- What plumbing projects would relate to natural resources and ecology systems?