Title: Monitor, adjust, and maintain physical properties of a solution/reagent.
Course: Biomedical Technician (14900) > Section: Performing Basic Laboratory Skills

Monitoring, adjusting, and maintaining the physical properties of a solution and/or reagent includes the parameters of pH, temperature, specific gravity, light exposure, and expiration, along with other labeling requirements.

Process/Skill Questions:

- Will the physical parameters of a solution or reagent remain constant with storage? Why, or why not?
- How could changes in the physical properties of a solution affect research results?
- Where would the biomedical technician obtain information on proper storage conditions for a reagent or solution?
- Should a reagent be used after the expiration date? Why, or why not?
- How would the biomedical technician monitor and adjust parameters for a specific solution or reagent?