Title: Compare the engineered systems involved in mining, drilling, and harnessing sources of energy.
Course: Engineered Energy Systems (20903-II) > Section: Introducing Energy Systems

Comparison should include

- historical approaches
- modern mining and drilling practices
- harnessing methods
- efficiencies
- current and emerging technologies.

Process/Skill Questions:

- How can these processes be made more efficient?
- What are examples of historical challenges that lead to innovations?
- What are other ways to capture energy?