Title: Model an engineered system for fossil fuel.
Course: Engineered Energy Systems (20903-II) > Section: Complying with Safety and Health Standards

Model should include use of electronic components and demonstrate concepts such as protective circuitry, warnings and alarms, and should facilitate system monitoring and control.

Process/Skill Questions:

- What components can be used as protective devices in an electronic circuit?
- How is monitoring and control simulated?