Title: Report personal injury, violations of environmental regulations, and equipment safety violations to the appropriate authority.
Course: Building Trades I (17009-I) > Section: Core Construction Skills: Applying Basic Construction Safety Standards (Core Safety): Electricity I

Report should include an oral or written statement identifying the violation and the date it was observed and should be given to the instructor, supervisor, or local OSHA inspector(s).

Process/Skill Questions:

- What ethical considerations are involved when reporting coworkers?
- Why is it important to follow reporting procedures?
- What is liability?

NCCER Standards:

Core Curriculum: Introductory Craft Skills

  - 00101-04 Basic Safety
  - 00107-04 Basic Communication Skills