Title: Identify tools specific to electricians.
Course: Building Trades I (17009-I) > Section: Electricity: Applying Basics of Electricity

Identification could include

- naming various hand tools
- stating the usage of hand tools
- citing the maintenance associated with each tool
- safely using tools in accordance with the manufacturer’s instructions, government regulations, and instructor's guidelines.

Process/Skill Questions:

- Why might an electrician use a hacksaw?
- What is the function of conduit?
- Why is it important to keep an extra charged battery with a cordless drill?

NCCER Standards:

Electrical

- 26106-02 Electrical Test Equipment